Wednesday 10 October 2001

09:00 - 09:15 arrival and hand out of material 09:15 - 09:30

09:30 - 10:45 The same input parameters are used to compute the absorption coefficients.

10:45 - 11:15 coffee break

11:15 - 11:45 (continuation of the previous session)

11:45 - 12:30

12:30 - 13:45 Lunch

13:45 - 15:30

15:30 - 16:00 coffee break

16:00 - 16:15

16:15 - 17:15

17:15 - 18:15 For specified instrumental characteristics the spectra as seen by instrument will be compared.

18:15 Close the first day workshop

18:30 - 21:00 welcome and introduction (Bühler, Eriksson) Species Absorption Intercomparison - Case 1A (Part 1)

Species Absorption Intercomparison - Case 1A (Part 2)

Continua Absorption Implementation Intercomparison - Case1B This deals with the intercomparison of the continua model implementation.

Species Absorption Intercomparison - Case 2

The aim of this case is to check the sensitivity of different models to the input variables. Computed absorption coefficients, using the standard inputs specific to each model, will be compared.

Discussions on the Absorption Coefficients Intercomparison: Implementation + Sensitivity Radiative transfer Intercomparison: Down- looking geometry - Case 3 Using the absorption coefficients as input, and for given instrumental specifications, the pencil beam spectra, and the spectra as seen by the instrument will be compared.

Radiative transfer Intercomparison: Down- looking geometry - Case 4

Workshop Dinner at Pinocchio Restaurant